Cured-In-Place-Pipelining Demonstration Days July 18 – 19

Perma-Liner Industries, LLC. to Hold Live Cured-In-Place-Pipelining Demonstration Days and Educational Sessions

Open House will be held in Anaheim, Cali. on July 18 – 19

ANAHEIM, Cali. – With state-of-the-art technology options, it is not necessary to dig up aging or failing pipes to repair them. There is an efficient and cost-effective way to repair these pipes called the Cured-In-Place-Pipe (CIPP) method. Perma-Liner Industries, LLC. (“Perma-Liner”), the leading manufacturer and supplier of trenchless pipeline rehabilitation equipment and materials in North America, is holding an Open House from 9 a.m. – 4 p.m. on July 18 – 19 at its Anaheim, Cali. facility located at 1910 E. Wright Cir.

Throughout the multi-day event, company professionals will provide information about Perma-Liner and the technology the company is known for nationwide, which include the Patented Perma-Lateral Lining System, Sectional Point Repair, Perma-Main Continuous Lining Top Gun and InnerSeal Lateral Connection Solution. Attendees will have the opportunity to view and interact with Perma-Liner materials and equipment while also observing live demonstrations in the Anaheim facility.

Additionally, the company’s turn-key trailer systems will be onsite so attendees can learn how the materials are Q/A tested and installed using Perma-Liner Installation Methods. The same certified installation methods are used by municipal agencies, drain cleaners, plumbers, and municipal contractors worldwide.

During the two-day event, Perma-Liner will unveil a new technology that will join its already robust catalog of equipment and materials. This will be the first time the public will get a look at the company’s newest technology.

Anyone interested in learning more about the technology, looking for a certified Perma-Liner installer, or becoming a certified installer is invited to attend. To attend, complete the registration form

###

About Perma-Liner Industries, LLC.

Perma-Liner (PLI) is the leading manufacturer and supplier of trenchless pipeline rehabilitation equipment and materials in North America. Since 1999, PLI has developed systems to rehabilitate existing sewer systems without excavation. To learn more about Perma-Liner, visit https://www.perma-liner.com/.

The post Cured-In-Place-Pipelining Demonstration Days July 18 – 19 appeared first on Broken Sewer Pipe Miami | Perma-Liner Industries.